Facebook Post (28/11/2024)

Enhance the tenant experience with our keypads. Sentinel Keypads operate online and offline, offering tenants uninterrupted access.

You can call us on 1300 852 117 (AU) or 0800 746 311 (NZ) to learn more about our keypads and how we can help you with your facility’s security.

#SentinelAU #SentinelNZ

View on Facebook