Facebook Post (12/12/2024)

Sentinel’s Unit Alarms provide real-time alerts for enhanced security. Make sure each unit’s alarm system is fully integrated with your management software for instant notifications, helping protect tenants’ valuables and giving them peace of mind.

You can call us on 1300 852 117 (AU) or 0800 746 311 (NZ) to learn more about our products and how we can help improve your facility security.

#SentinelAU #SentinelNZ

View on Facebook